))ν(_Tp),μ(_Tp(ϕΔ

0 0.5 1 1.5 2 2.5 3

(pb) ϕΔ/dσd

-510

-410

-310

-210

-110 1 M(W’)=1000 GeV M(W’)=1500 GeV M(W’)=2000 GeV M(W’)=2500 GeV M(W’)=3000 GeV νμ →W’