(W’) [GeV] Tm 0 1000 2000 3000 4000

(pb) T /dm σd

0.02

0.04

0.06

M(W’)=1000 GeV M(W’)=1500 GeV M(W’)=2000 GeV M(W’)=2500 GeV M(W’)=3000 GeV