(W’) [GeV] Tm 0 1000 2000 3000 4000

(pb) T /dm σd

-410

-310

-210

-1 10

1 M(W’)=1000 GeV M(W’)=1500 GeV M(W’)=2000 GeV M(W’)=2500 GeV M(W’)=3000 GeV νμ →W’