|<2.5) η >20 GeV, | T (C4, p jetN

0 1 2 3 4 5 6 7 8 9 10

/dN (pb) σd

-510

-410

-310

-210

-110

1^{M(W’)=1000 GeV}

M(W’)=1500 GeV M(W’)=2000 GeV M(W’)=2500 GeV M(W’)=3000 GeV νμ →W’